8.1 CHAPTER VIII FIGURES

8.2

8.3

8.4

Figure 3. Original Shepp-Logan Phantom

8.5

Figure 4. Shepp-Logan Phantom Reconstructed from Multiscale Edges

8.6

Figure 5. Noisy Phantom, 2 Million Photons

8.7

Figure 6. Restored Phantom with Modulus Filter

8.8

Figure 7. Raysum of Shepp-Logan Phantom

8.9

Figure 8. Noisy Raysum, 2 Million Photons

8.10

Figure 9. CBP Image from Noiseless Raysum

8.11

Figure 10. CBP Image from Noisy Raysum

8.12

Figure 11. CBP Image with Parabola Filter from Noiseless Raysum

8.13

Figure 12. CBP Image with Parabola Filter from Noisy Raysum

8.14

Figure 13. CBP Image with Modulus Filter from Noiseless Raysum

8.15

Figure 14. CBP Image with Modulus Filter from Noisy Raysum

8.16

Figure 15. CBP Image with Modulus Filter and Edge Tracking (Noiseless)

8.17

Figure 16. CBP Image with Modulus Filter and Edge Tracking (Noisy)

8.18

Figure 17. CBP Image with Edge Tracking on Noiseless Raysum

8.19

Figure 18. CBP Image with Edge Tracking on Noisy Raysum

8.20

Figure 19. CBP Image with Modulus and Local Phase Variance Threshold (Noiseless)

8.21

Figure 20. CBP Image with Modulus and Local Phase Variance Threshold (Noisy)

8.22

Figure 21. CBP Image with Local Phase Variance Thresholding (Noiseless)

8.23

Figure 22. CBP Image with Local Phase Variance Thresholding (Noisy)

8.24

Figure 23. CBP Image with Modulus and Scale Phase Variation Thresholding (Noiseless)

8.25

Figure 24. CBP Image with Modulus and Scale Phase Variation Thresholding (Noisy)

8.26

Figure 25. CBP Image with Scale Phase Variation Thresholding (Noiseless)

8.27

Figure 26. CBP Image with Scale Phase Variation Thresholding (Noisy)