8.28

Figure 27. DFR Image from Noiseless Raysum

8.29

Figure 28. DFR Image from Noisy Raysum

8.30

Figure 29. DFR Image with Lowpass Filter

8.31

Figure 30. DFR Image with Square Root Filter

8.32

Figure 31. DFR Image with Modulus Filter

8.33

Figure 32. DFR Image with Edge Tracking

8.34

Figure 33. Original Lena Image

8.35

Figure 34. Noisy Lena Image, 100000 Photons

8.36

Figure 35. Lena Image Restored by 5� 5 Average Filter

8.37

Figure 36. Lena Image Restored by Wavelet Modulus Thresholding

8.38

Figure 37. Lena Image Restored by Scale Phase Variation Thresholding