-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0 2 4 6 8 10 12 14 Diamond-random/P1 (M: 6,400, nz: 1,560,830, density = %)

hist ( eval,1000 )

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0 0.5 1 1.5 2 2.5 3

hist ( eval,10000 )