-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0 20 40 60 80 100 120 Mixed/SiO2/P0 (N: 5,524, snz: 665,920, sparse density: 4.3%)

hist ( eval,1000 )

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0

5

10

15

hist ( eval,10000 )