Fig. 8. View parallel to the layers of the vortex structure in the layered three-dimensional model. Pictured are isosurfaces of the magnetic field magnitude as the vortices cross superconducting layers.

Fig. 9. View looking down on the layers of the vortex structure in the layered three-dimensional model. Pictured are isosurfaces of the order parameter magnitude. Recall that the order parameter is defined only within the superconducting sheets.